U.S. thanks Qatar for support in evacuating Americans from Lebanon

Other countries that have evacuated their citizens include China, Germany, Spain, France, Lithuania, Australia, Canada, the United Kingdom, Italy, Belgium, Brazil among many others. The United States has thanked Qatar…

(The post U.S. thanks Qatar for support in evacuating Americans from Lebanon is from Doha News | Qatar.)