Qatar announces expiry of AFC Asian Cup Hayya Card

The Hayya Card has expired as the AFC Asian Cup tournament ended over the weekend, with cardholders told they must leave Qatar by February 24, 2024. Doha has announced the…

(The post Qatar announces expiry of AFC Asian Cup Hayya Card is from Doha News | Qatar.)