Only 3% of Qatar investors keen on hospitality sector: survey

The average daily rates in December 2022 reached an average of QAR 2,112 compared to December 2021 where it reached QAR 454. Only 3% of potential investors expressed interest in…

(The post Only 3% of Qatar investors keen on hospitality sector: survey is from Doha News | Qatar.)